width height=Area/width Max Deflection Max Deflection Concentrated Load Uniform Load 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0.045

Table 1: Maximum deflection of a beam of constant rectangular cross section. Support = Cantilevered; Material = Aluminum; Length = 1 m; Area of cross section = 0.0004 square meters.